Using the same approach in the thermosphere for the waves with wavelengths of 90 and 250 km, we find amplitudes of 10 K and 30 K. Again, the temperature fluctuations seen in the Galileo data are plotted as points, and the sum of the two most significant waves are plotted as the solid line. We can improve matters if we allow the amplitude of the 90 km wave to decrease with height, as shown with the dashed line.

Thermospheric waves 6