The two waves seen in the stratosphere’s periodogram, with wavelengths of 66 km and 99 km, have amplitudes of ~5 K. The temperature fluctuations seen in the Galileo data are plotted as points, and the sum of the two most significant waves are plotted as the solid line. There are probably other waves at smaller amplitudes present as well.

Stratospheric waves 5