When we subtract the mean temperature profile, we are left with wave-like temperature fluctuations. In the thermosphere, we see large-amplitude, large-wavelength coherent waves. In the stratosphere, the waves are smaller in amplitude and wavelength, and the wave structure is harder to see (if it even exists).

Temperature oscillations 3